\doxysection{dblist Struct Reference}
\hypertarget{structdblist}{}\label{structdblist}\index{dblist@{dblist}}


phantom documentation used to test the functioning of doxygen  




{\ttfamily \#include $<$util.\+h$>$}

\doxysubsubsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\Hypertarget{structdblist_a14615ff4b03d8f42730257cba4c50a1d}\label{structdblist_a14615ff4b03d8f42730257cba4c50a1d} 
\mbox{\hyperlink{structelem}{elem}} \texorpdfstring{$\ast$}{*} {\bfseries first}
\begin{DoxyCompactList}\small\item\em \texorpdfstring{$\ast$}{*}first phantom documentation \end{DoxyCompactList}\item 
\Hypertarget{structdblist_ab5a72762ee26deb694dc0c89fdbda49f}\label{structdblist_ab5a72762ee26deb694dc0c89fdbda49f} 
\mbox{\hyperlink{structelem}{elem}} \texorpdfstring{$\ast$}{*} {\bfseries last}
\begin{DoxyCompactList}\small\item\em \texorpdfstring{$\ast$}{*}last phantom documentation \end{DoxyCompactList}\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
phantom documentation used to test the functioning of doxygen 

The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/util.\+h\end{DoxyCompactItemize}
