\doxysection{stack\+\_\+index\+\_\+t Struct Reference}
\hypertarget{structstack__index__t}{}\label{structstack__index__t}\index{stack\_index\_t@{stack\_index\_t}}


phantom documentation used to test the functioning of doxygen  


\doxysubsubsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\Hypertarget{structstack__index__t_ad0aae1e2bf45eb8855155ad713b4c3d4}\label{structstack__index__t_ad0aae1e2bf45eb8855155ad713b4c3d4} 
long {\bfseries stack\+\_\+id}
\begin{DoxyCompactList}\small\item\em stack\+\_\+id phantom documentation \end{DoxyCompactList}\item 
\Hypertarget{structstack__index__t_a9b5ca3909ae086aa1ecbf4d581c2d596}\label{structstack__index__t_a9b5ca3909ae086aa1ecbf4d581c2d596} 
void \texorpdfstring{$\ast$}{*} {\bfseries container\+\_\+widget}
\begin{DoxyCompactList}\small\item\em container\+\_\+widget phantom documentation \end{DoxyCompactList}\item 
\Hypertarget{structstack__index__t_af27d972a040feb4ad2c52e7575e85854}\label{structstack__index__t_af27d972a040feb4ad2c52e7575e85854} 
void \texorpdfstring{$\ast$}{*} {\bfseries gl\+\_\+area}
\begin{DoxyCompactList}\small\item\em gl\+\_\+area phantom documentation \end{DoxyCompactList}\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
phantom documentation used to test the functioning of doxygen 

The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
src/util/draw/\mbox{\hyperlink{gl_8c}{gl.\+c}}\end{DoxyCompactItemize}
