\doxysection{src/fsm/preferences/manager.c File Reference}
\hypertarget{preferences_2manager_8c}{}\label{preferences_2manager_8c}\index{src/fsm/preferences/manager.c@{src/fsm/preferences/manager.c}}
{\ttfamily \#include "{}../../../include/fsm.\+h"{}}\newline
{\ttfamily \#include "{}../../../include/signal.\+h"{}}\newline
{\ttfamily \#include "{}../../../include/widget.\+h"{}}\newline
\doxysubsubsection*{Classes}
\begin{DoxyCompactItemize}
\item 
struct \mbox{\hyperlink{structpreferences}{preferences}}
\begin{DoxyCompactList}\small\item\em use this ? static const char \texorpdfstring{$\ast$}{*}icon\+\_\+name \mbox{[}3\mbox{]} = \{ "{}document-\/revert-\/rtl-\/symbolic"{}, "{}edit-\/undo-\/symbolic"{}, "{}view-\/refresh-\/symbolic"{} \}; \end{DoxyCompactList}\end{DoxyCompactItemize}
\doxysubsubsection*{Functions}
\begin{DoxyCompactItemize}
\item 
\Hypertarget{preferences_2manager_8c_a42a491a3a432cf572b3c2ed84a00d927}\label{preferences_2manager_8c_a42a491a3a432cf572b3c2ed84a00d927} 
void {\bfseries fsm\+\_\+set\+\_\+store\+\_\+restore\+\_\+reset} (int choice, int value)
\begin{DoxyCompactList}\small\item\em phantom documentation used to test the functioning of doxygen \end{DoxyCompactList}\item 
\Hypertarget{preferences_2manager_8c_abb1b857c9ec1ab39d6cb7cdf683a08d1}\label{preferences_2manager_8c_abb1b857c9ec1ab39d6cb7cdf683a08d1} 
void {\bfseries fsm\+\_\+reset\+\_\+all\+\_\+situations\+\_\+values} (int value)
\begin{DoxyCompactList}\small\item\em phantom documentation used to test the functioning of doxygen \end{DoxyCompactList}\item 
\Hypertarget{preferences_2manager_8c_aa69a9ce07b26ad1863960c6f0d1303b5}\label{preferences_2manager_8c_aa69a9ce07b26ad1863960c6f0d1303b5} 
void {\bfseries fsm\+\_\+add\+\_\+displayable} (char \texorpdfstring{$\ast$}{*}displayable\+\_\+name)
\begin{DoxyCompactList}\small\item\em phantom documentation used to test the functioning of doxygen \end{DoxyCompactList}\item 
\Hypertarget{preferences_2manager_8c_aa02db2c62f7507eabfcc9a41f0e660b6}\label{preferences_2manager_8c_aa02db2c62f7507eabfcc9a41f0e660b6} 
void {\bfseries fsm\+\_\+list\+\_\+init\+\_\+preferences} ()
\begin{DoxyCompactList}\small\item\em phantom documentation used to test the functioning of doxygen \end{DoxyCompactList}\item 
\Hypertarget{preferences_2manager_8c_a8eaa768708ebc21d710a8cc6144af1d3}\label{preferences_2manager_8c_a8eaa768708ebc21d710a8cc6144af1d3} 
void {\bfseries fsm\+\_\+list\+\_\+init\+\_\+displayables} ()
\begin{DoxyCompactList}\small\item\em phantom documentation used to test the functioning of doxygen \end{DoxyCompactList}\end{DoxyCompactItemize}
\doxysubsubsection*{Variables}
\begin{DoxyCompactItemize}
\item 
\Hypertarget{preferences_2manager_8c_aca528e2aeb796176a06819e058557e72}\label{preferences_2manager_8c_aca528e2aeb796176a06819e058557e72} 
struct \mbox{\hyperlink{structpreferences}{preferences}} \texorpdfstring{$\ast$}{*} {\bfseries pref\+\_\+jean} = NULL
\begin{DoxyCompactList}\small\item\em phantom documentation used to test the functioning of doxygen \end{DoxyCompactList}\end{DoxyCompactItemize}
