\doxysection{pile Struct Reference}
\hypertarget{structpile}{}\label{structpile}\index{pile@{pile}}


phantom documentation used to test the functioning of doxygen  




{\ttfamily \#include $<$util.\+h$>$}

\doxysubsubsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\Hypertarget{structpile_a404c7f7ab8c7abe008de4e28657983c8}\label{structpile_a404c7f7ab8c7abe008de4e28657983c8} 
int {\bfseries value}
\begin{DoxyCompactList}\small\item\em value phantom documentation \end{DoxyCompactList}\item 
\Hypertarget{structpile_a34a9ae6f1ef6a39ba2c809da6dd4921d}\label{structpile_a34a9ae6f1ef6a39ba2c809da6dd4921d} 
struct \mbox{\hyperlink{structpile}{pile}} \texorpdfstring{$\ast$}{*} {\bfseries prev}
\begin{DoxyCompactList}\small\item\em \texorpdfstring{$\ast$}{*}prev phantom documentation \end{DoxyCompactList}\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
phantom documentation used to test the functioning of doxygen 

The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/util.\+h\end{DoxyCompactItemize}
