\doxysection{slist Struct Reference}
\hypertarget{structslist}{}\label{structslist}\index{slist@{slist}}


phantom documentation used to test the functioning of doxygen  




{\ttfamily \#include $<$util.\+h$>$}

\doxysubsubsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\Hypertarget{structslist_a6c4e65b559a5537f7854b0d828204436}\label{structslist_a6c4e65b559a5537f7854b0d828204436} 
int {\bfseries value}
\begin{DoxyCompactList}\small\item\em value phantom documentation \end{DoxyCompactList}\item 
\Hypertarget{structslist_a1dbb9625c8b52c7a6ae2d2e83b37fd43}\label{structslist_a1dbb9625c8b52c7a6ae2d2e83b37fd43} 
struct \mbox{\hyperlink{structslist}{slist}} \texorpdfstring{$\ast$}{*} {\bfseries suiv}
\begin{DoxyCompactList}\small\item\em \texorpdfstring{$\ast$}{*}suiv phantom documentation \end{DoxyCompactList}\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
phantom documentation used to test the functioning of doxygen 

The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/util.\+h\end{DoxyCompactItemize}
